〉η/d_{ch}N d〈

Particle ratio

0 20 40 60 0

0.2

0.4

0.6 ALICE = 5.02 TeV NNs p-Pb

= 7 TeV s INEL pp = 2.76 TeV NNs 60-80% Pb-Pb

)^-π

+ ^+π

)/( p ( p + ×3 0 20 40 60 0

0.2

0.4

0.6

)^-π

+ ^+π

)/( - + K + ( K c < 20 GeV/ Tp 10 <